Fx 0.3 0.4 0.5 0.6 0.7

N A

0

0.2

0.4

0.6

0.8 = 200 GeV s + X at η, ^0π→

+ p ↑ STAR p

101 (2008) PRL >=3.7 η no center cut, < 0π >=3.68 η center cut, < 0π >=3.68 η center cut, < η