)_{γγ}ϕ tan(

-0.4 -0.2 0 0.2 0.4 γγη

3.4 3.6 3.8 4 0π

)_{γγ}ϕ tan(

-0.4 -0.2 0 0.2 0.4 γγη

3.4 3.6 3.8 4 η