eσn -10 -8 -6 -4 -2 0 2 4

Counts

1 10 210 310 410 510 610 (GeV/c) < 0.5 T 0.4 < p (GeV/c) < 0.5 T 0.4 < p Dataπ Fit Fit e + e π Fit