(GeV/c) Tp 0 0.5 1 1.5 2

]^{-2} dy) [(GeV/c) Tdp_Tpπ N/(2 2d

-3 10

-2 10

-1 10 p+p ω STAR p+p ω PHENIX T Tsallis fit to high p