/ ndf

2χ 24.56 / 14

Yield ω 11.81 ± 38.07

0.7 0.8 0.9

Counts

0

10

20

30 ± ± <0.4 GeV/c T 0.0<p

/ ndf

2χ 20.51 / 14

Yield ω 10.78 ± 38.16

)^2

(GeV/c eeM 0.7 0.8 0.9

Counts

0

10

20

30 ± ± <0.8 GeV/c T 0.4<p

/ ndf

2χ 7.723 / 14

Yield ω 7.74±

24.04

0.7 0.8 0.9

Counts

0

10

20

30 <1.6 GeV/c T 0.8<p

2-component Fit Residual BG

0

10

20

30

Counts