Counts

20 40 60 80 100 <4GeV/c T 3<p

right sign (RS) wrong sign (WS) side band (SB)

)^2

) (GeV/c π ) - M(K ππ M(K 0.14 0.145 0.15 0.155

)^2 Counts (/0.2 MeV/c

0 20 40 RS-SB