Counts

100 200 300 400 500 600 <3GeV/c T 2<p

right sign (RS) wrong sign (WS) side band (SB)

)^2

) (GeV/c π ) - M(K ππ M(K 0.14 0.145 0.15 0.155

)^2 Counts (/0.2 MeV/c

0 50 100 RS-SB