(GeV/c) Tp 0 0.5 1 1.5 2

)^2 - PDG (MeV/c 〉M〈

-20 -10 0 10 20^0D Data-LS Data-Rot Simulation

(GeV/c) Tp 2 3 4 5 6

)^2

- PDG (MeV/c 〉MΔ〈

-0.4

-0.2 0 0.2 0.4^±D* Data

Simulation

(GeV/c) Tp 0 0.5 1 1.5 2

)^2 Width (MeV/c

5 10 15 20

(GeV/c) Tp 2 3 4 5 6

)^2

Width (MeV/c

0 0.2 0.4 0.6