)^2

) (GeV/c π M(K 1.8 1.9 2

)^3 10 × Raw Counts (

0

1

2

3 <1.2 GeV/c T 0.6<p (a)

)^2

) (GeV/c π M(K 1.8 1.9 2

)^3 10 × Raw Counts (

0

1

2

3 <1.2 GeV/c T 0.6<p (b)