)^2

) (GeV/c π M(K 1 2 3

)^2 per 10 MeV/c 3 10 × Counts (

0

200

400

600

800

(a)

Unlike Sign (US) Like Sign (LS) Rotation (Rot)

)^2

) (GeV/c π M(K 1 2 3

)^2 per 10 MeV/c 3 10 × Counts (

0

50

100

150 US - LS US - Rot

(b)