(GeV/c) Tp 0 1 2 3 4 5 6

]^2 dy) [mb/(GeV/c) Tdp_Tpπ )/(2 ccσ^2(d

-6 10

-4 10

-2 10

1 PYTHIA v6.416

This tune

Default

PHENIX PRC2010

STAR Data