)^2

(GeV/c eeM 0 0.2 0.4 0.6 0.8

/GeV) 2 dN/dM (c

-4 10

-3 10

-2 10

-1 10

1^{w/o photon rejection}

w photon rejection conversion pairs

= 200 GeV NNs Au + Au

0.00 0.05 0.10 0.15

Beam pipe Supportting structure

TPC inner field cage