0 0.05 0.1 0.15 -7 10

-4 10

-1 10 STAR with PHX acc.

PHENIX 0π (a) 0 0.2 0.4 0.6 -8 10

-6 10

-4 10 η (b) 0 0.5 1 -9 10

-7 10

-5 10 ρ (c)

0 0.5 1 -9 10

-7 10

-5 10 ω (d) 0 0.5 1 -9 10

-7 10

-5 10 ’η (e) 0 0.5 1 -10 10

-8 10

-6 10 ϕ (f)

0 1 2 3 4 -10 10

-8 10

-6 10 cc (g) 2.5 3 3.5 4 -10 10

-8 10

-6 10 ψJ/ (h) 3.5 4 -11 10

-9 10

-7 10 ’ψ (i) dN/dM

)^2

(GeV/c eeM