(GeV/c) Tp 0 1 2 3

Acceptance × Efficiency

0

0.02

0.04

0.06

0.08

0.1 = 200 GeV (MinBias) NNs Au + Au (|y|<1) - + e + e →ϕ (|y|<1) - + e + e →ω