)^2

(GeV/c eeM 0 1 2 3 4

/GeV)

2 (c ee dN / dM

-7 10 -6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 signal^-e^+e hadron contamination parameterization

Minimum-bias