(GeV) e T E 10 20 30 40 50 60 70

Counts

1

10

210

310

410 cluster reconstructed

Candidate track and BEMC r| < 7 cm Δ > 15 GeV and | e T E > 0.95 4×4 T/E^e_T E

> 0.88

R<0.7 Δ T/E^e_T E

- balance > 15 GeV/c T Signed P