Thu Nov 10 14:35:41 2011

Beam displacement in x (mm)

-1 -0.5 0 0.5 1

Trigger Rate (Hz)

0 5 10 15 20

Beam displacement in y (mm)

-1 -0.5 0 0.5 1

Trigger Rate (Hz)

0 5 10 15 20 25