η

-1 0 1

ϕ

-2 0 2

(GeV/c) T TPC p

0 10 20 30 40 (b) (GeV/c) T TPC p η

-1 0 1 2

ϕ

-2 0 2

(GeV) T EMC E

0 10 20 30 40 (c) (GeV) T EMC E