0.00205

0.0021

0.00215

0.0022

0.00225

0.0023

0.00235

ϕΔ -1 -0.5 0 0.5 1

ηΔ

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 a)

0.00205

0.0021

0.00215

0.0022

0.00225

0.0023

0.00235

0.0024

ϕΔ -1 -0.5 0 0.5 1

ηΔ

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 b)

0.00205

0.0021

0.00215

0.0022

0.00225

0.0023

0.00235

0.0024

ϕΔ -1 -0.5 0 0.5 1

ηΔ

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 c)

0.00205

0.0021

0.00215

0.0022

0.00225

0.0023

0.00235

ϕΔ -1 -0.5 0 0.5 1

ηΔ

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 d)