0.0023

0.00235

0.0024

0.00245

0.0025

0.00255

ϕΔ -1 -0.5 0 0.5 1

ηΔ

-0.6

-0.4

-0.2 0 0.2 0.4 0.6

ϕΔ -1 -0.5 0 0.5 1

0.0046

0.00465

0.0047

0.00475

0.0048

0.00485

0.0049

0.00495

0.005

0.00505

ηΔ -0.5 0 0.5

arbitrary units