(GeV/c) Tp 1 1.5 2 2.5 3 3.5 4

efficiency

0.7

0.75

0.8

0.85

0.9

Au+Au 200 GeV 0-12% d+Au 200 GeV

Cu+Cu 62 GeV 0-10% Au+Au 62 GeV 0-10%

Cu+Cu 200 GeV 50-60%