0 2 4 6 8

-2 (GeV/c) T N/dydp

2 d_Tpπ1/2

-11 10

-7 10

-3 10

10

0 0-10% x10 -1 10-20% x10 -2 20-30% x10 -3 30-40% x10 -4 40-60% x10

S 0 Cu+Cu K

0 2 4 6 8

-11 10

-7 10

-3 10

10 Λ

Cu+Cu Λ Cu+Cu

0 2 4 6 8

-11 10

-7 10

-3 10

10 Ξ

Cu+Cu Ξ Cu+Cu

0 2 4 6 8

-11 10

-7 10

-3 10

10 Ω+Ω Cu+Cu

(GeV/c) Tp 0 2 4 6 8

-11 10

-7 10

-3 10

10

0 0-5% x10 -1 10-20% x10 -2 20-40% x10 -3 40-60% x10 -4 60-80% x10

S 0 Au+Au K

0 2 4 6 8

-11 10

-7 10

-3 10

10 Λ

Au+Au Λ Au+Au