ϕ_Δ

Δρ /√ρ_{ref}

200 GeV Au-Au 0-5%

m = 2

m = 3 m = 1

m = 4

AS SS

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6

0 2 4