beam /yη -1.5 -1 -0.5 0 0.5 1 1.5

1v

-0.15

-0.1

-0.05

0

0.05

0.1

0.15 Cu+Cu Collisions 22.4 GeV(0-60%) 62.4 GeV(30-60%) 200 GeV(30-60% )