p/|Z| (GeV/c)

-0.5 0 0.5

(keV/cm) 〉 dE/dx 〈

0

20

40

60

80

-π

-K p d

H^3

He^3

He^4

Negative Particles

1 2 3 0

20

40

60

80

p/|Z| (GeV/c)

(keV/cm) 〉 dE/dx 〈

-0.5 0 0.5 0

20

40

60

80

+π

+K p d

H^3

He^3

He^4

Positive Particles

1 2 3