(GeV/c) Tp 0 5 10 15 20

counts (arb. units)

-10 10

-7 10

-4 10

-1 10

210 310 γ + direct γ2→η/^0π γ direct × + 2 γ2→η/^0π γ2→η/^0π γ γ × a)

(GeV/c) Tp 0 5 10 15 20

ratio

0 0.5 1 1.5 2 b)