eσn -5 0 5

counts (arb. units)

0

10

20

30 a) data_± +p^±K_± π_± e 3-Gaus fit data_± e /NDF: 54.9/52.0 2χ

eσn -5 0 5

counts (arb. units)

0 10 20 30 40 b) /NDF: 54.8/49.0 2χ

eσn -5 0 5 counts (arb. units)

0

10

20

30

40 /NDF: 38.5/33.0 2χ c)