eσn 0 5

counts (arb. units)

0

200

400 a) unlike pairs like pairs unlike pairs unlike-like Gaus fit /NDF: 38.2/35.0 2χ 0.03 ± mean: -0.13 0.02 ± : 0.88 σ

eσn 0 5

counts (arb. units)

0

50

100 b) unlike pairs like pairs unlike pairs unlike-like Gaus fit /NDF: 22.7/31.0 2χ 0.08 ± mean: -0.03

0.06 ± : 0.99 σ

(GeV/c) Tp 2 4 6 8 mean and width

0

0.5

1

1.5

2 c) σ mean σ pol2 fit

uncertainty