(GeV/c) Tp 2 4 6 8

npe/pho

0

1

2

3 run08 run05 a)

(GeV/c) Tp 2 4 6 8 10

)^3c^{-2}

(mb GeV 3 /dp σ^3 Ed

-10 10

-9 10

-8 10

-7 10

-6 10

-5 10

-4 10 run08 run05 FONLL uncertainty

Global uncertainty: 8.1% b)