(GeV/c) Tp 1 2 3 4 5 6 7 8

counts (arb. units)

-10 10

-9 10

-8 10

-7 10

-6 10

-5 10

-4 10

-3 10 MB HT1 HT2 power-law fit uncertainty

/ndf: 18.8/29 2χ