Ratios

0 0.2 0.4 0.6 0.8 1 1.2

, K, p π Ξ,Λ , K, p, π Data points

fitted predicted

+π/^-π +/K^-K /pp Λ/Λ -Ξ/^+Ξ -π/^-K -π/p -π/Λ -π/^+Ξ -π/_s^0K

Std. Dev.

0 5