0 1 2 3 4 5 6 7 8 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

[GeV/c] Tp

CPR

-π+^+π^0_sK )Λ+Λ( )^+Ξ+^-Ξ(

40-80%

0-10%