10^210 -3 10 -2 10 -1 10

-π/Λ^-π/Λ

SPS RHIC

(GeV) NNs 10^210

-3 10

-2 10

-π/^-Ξ^-π/^+Ξ

(GeV) NNs 10^210 -4 10

-3 10 -π/^-Ω^-π/^+Ω

(central, y = 0) -π (dN/dy)/