Peripheral

)_π /dN/dy B ) / (dN/dy π /dN/dy B (dN/dy

/dy ch dN 10^210^310 1

1.5

2 π/p π/Λ π/^+Ξ

/dy ch dN 10^210^310 1

1.5

2 10^210^310 1

1.5

2 62.4 GeV πp/ π/Λ π/^-Ξ

10^210^310

1

1.5

2 200 GeV