0.45 0.5 0.55 0 2 4 6 8 10 12 (a) s 0K

1.1 1.12 1.14 0 2 4 6 8 10 12 b)

(x 2) Λ Λ

1.3 1.35 0 2

4 6 8 10 12 c)

(x 50)

-Ξ_+ Ξ

1.65 1.7 1.75 0 2 4 6 8 10 12 d)

)^3

(x 10

-Ω_+ Ω

5 10⋅ Counts

]^2

Invariant Mass [GeV/c