De AA R 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Be AA R

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 I:Djordjevic II:Adil III:van Hees

(0-10 %)

PHENIX AAR CL 90 %