)^2

) (GeV/c π m(K,

1.7 1.8 1.9 2 2.1

Counts

-60

-40

-20

0

20

40

60

80 0D+ ^0D (a)

) (rad) 0 (e,D ϕΔ 0 1 2 3

)^{-1}

(rad ϕΔ 1/trig dN/d

0

0.005

0.01

0.015

0.02

0.025

3 GeV/c

≥ _T p+p 200 GeV, p PYTHIA, c+b (fit) MC@NLO, c+b (fit)

(b)