(GeV/c) Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

)^2 Mass (GeV/c

0.86

0.88 0.9 0.92

0.94

Au+Au 62.4 GeV Au+Au 200 GeV Cu+Cu 62.4 GeV Cu+Cu 200 GeV PDG value

(a)