)^2

) (GeV/c π (K invM

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

)^2 Counts/(10 MeV/c

0 2000

4000

6000

8000

10000 310 × (a) Au+Au 200 GeV

)^2

) (GeV/c π (K invM

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

)^2

Counts/(20 MeV/c

0 1000

2000

3000

4000 310 × (b) Au+Au 62.4 GeV

)^2

) (GeV/c π (K invM

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

)^2 Counts/(20 MeV/c

0 500 1000

1500

2000

2500

3000

3500 310 × (c) Cu+Cu 200 GeV

)^2

) (GeV/c π (K invM

0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

)^2

Counts/(20 MeV/c

-200 0 200 400 600 800 1000

1200

1400 310 × (d) Cu+Cu 62.4GeV