0 100 200 300

(GeV/c)

〉_Tp〈

0.6

0.8

1 < 4.0 GeV/c

trig T 3.0 < p

π_6^1

| < π-ϕΔ core | π_2^1

| < π-ϕΔ < | π_6^1 cone

partN

0 100 200 300

0.6

0.8

1 < 6.0 GeV/c

trig T 4.0 < p