Count

A

5 10 15 20 25

210

310

Λ H_Λ^3

(cm) τc

2χ

3 4 5 6 7 8 9 10 11 0 0.5 1 1.5 2 2.5

= 0.08 2χ = 1.08 2χ cm 1.4 2.7± = 5.5 τc

H lifetime (ps) Λ 3

B

-1 0 1 2 3 4 5 6 7 0 50 100 150 200 250 300 350 400 450

(PDG) Λ free Λ STAR free Dalitz, 1962 Glockle, 1998

PR136, 6B(1964)

819(1968)

PRL20,

PR180,1307(1969)

46(1970)

NPB16,

66(1970)

PRD1,

269(1973)

NPB67,

STAR

) (cm) World data γβ decay-length/(