0 10 20 30 40 50 60

2v

0.02

0.04

0.06

0.08

{FTPC} 2v {AA-pp, FTPC} 2v {TPC} 2v {AA-pp, TPC} 2v

± h → (a) 200 GeV Cu+Cu

0 10 20 30 40 50 60

0.02

0.04

0.06

0.08 ± h → (b) 62.4 GeV Cu+Cu

% Most Central