(GeV) s^210^310

(pb) y=0 /dy| ϒσ d⋅B

-110

1

10

210

310_{STAR, p+p}

CFS, p+A E605, p+A CCOR, p+p R209, p+p

R806, p+p p UA1, p+ p CDF, p+

NLO CEM, MRST HO, =1μ , m/ 2 m=4.75 GeV/c

(1S+2S+3S) ϒ