/dy (pb) σ Drell-Yan d

0 10 20 30 40 50 60 70 80

/dy (pb) σ dbb-

0

10

20

30

40

50

60 Contourσ2

Contour σ1 vs. Drell-Yan bb- , |y|<0.5 2 < 11 GeV/c ee 8< m

Drell-Yan NLO pQCD