)^2

(GeV/c eem 4 6 8 10 12 14 16 unlike - like sign counts

-10 0 10 20 30 40 50 60 STAR

=200 GeV s p+p,

|<0.5 ee|y

--N_{++}N - 2 +-N + DY, Fit b + b- ϒ Integral of Fit +DY bb-