)c/V Ge( _Tp 4 6 8 10 12 14 16

)^3c ^{2−}VGe (mb 3pd σ^3dE

−10 10 −910 −810 −710 −610 −510 −410 −310 −210 −110 1 p+p Au+d QCD p NLO scale uncertainty QCD p p+p

PHENIX dirγ