γR

0.0 0.5 1.0 1.5 2.0 2.5 3.0

0C Upper limit (a) p+p QCD p NLO scale uncertainty QCD p

)c/V Ge( _Tp 4 6 8 10 12 14 γR

0.0 0.5 1.0 1.5 2.0 2.5 3.0

0C Upper limit (b)

Au+d