MinBias 1 HighTower› 2 HighTower› Upper limit (HT2) Hard limit (HT2) p+p

)c/V Ge( _Tp 0 1 2 3 4 5 6 7 8 9

0C

0 0.2 0.4 0.6 0.8 1 1.2 1.4