0.2 0.4 0.6 0.8 1

Counts

0 200 400 600 800 1000 1 HighTower› p+p c/V < 5 Ge Tp 4 <

(a)

subtracted

Combinatorial background

Low›mass background

)^2c/V Ge( _{γγ}m

0.2 0.4 0.6 0.8 1

Counts

›200 0 200 400 600 800 1000

Combinatorial and low›mass background subtracted

(b)