η 0 0.2 0.4 0.6 0.8 1 total / Counts

0 0.02 0.04 0.06 1 HighTower› p+p Simulation (a)

(rad) φ −3 −2 −1 0 1 2 3 0 0.02 0.04 0.06 (b)

310×

)c/V Ge( _Tp 0 10 20 total / Counts

−510 −410 −310 −210 −110 1 MinBias 1 HighTower› 2 HighTower› Simulation p+p

(c)

)^2c/V Ge(γγm 0 0.2 0.4 0.6 0.8

Counts

1 2 3 4 1 HighTower› p+p

(d)

0π η